/*
 Navicat Premium Data Transfer

 Source Server         : 生产库 mysql - 10.39.0.85
 Source Server Type    : MySQL
 Source Server Version : 90200
 Source Host           : 10.39.0.85:3306
 Source Schema         : huixiabao

 Target Server Type    : MySQL
 Target Server Version : 90200
 File Encoding         : 65001

 Date: 19/03/2025 15:25:30
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for HmbXyxInfo_Update
-- ----------------------------
DROP TABLE IF EXISTS `HmbXyxInfo_Update`;
CREATE TABLE `HmbXyxInfo_Update`  (
  `xyxNo` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '小药箱编号。',
  `update_time` datetime NOT NULL COMMENT '更新时间',
  PRIMARY KEY (`xyxNo`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci COMMENT = '小药箱信息更新记录表，表中有数据时，表示该小药箱记录需向医保局发送更新记录。' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
